[C] 2Q 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

9−10 ×

[C] 0Q

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 9−10

× h5 Entries 10000 Mean x 10−

3.476e Mean y 10−

8.869e RMS x 10− 4.57e RMS y 10−

3.131e h5 Integral of the first channel vs integral of the second channel

[V] 2 Max_ampl

0 0.05 0.1 0.15 0.2 0.25 0.3

[V] 0 Max_ampl

0.05

0.1

0.15

0.2

0.25

0.3 h6 Entries 10000 Mean x 0.04687 Mean y 0.09134 RMS x 0.04912 RMS y 0.03073 h6 Amplitude of the first channel vs amplitude of the second channel